d0NegDeuteronBand

Entries 442 Mean -0.01131 RMS 0.3771

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 10 20 30 40 50 60 d0NegDeuteronBand^{d0NegProtonBand}_{Entries 253819}

Mean -0.04471 RMS 0.4673