% ADC Change

0 5 10 15 20 25 30 35 40 45 0 0.5 1 1.5 2 2.5 3 3.5 4 10m Green Fibre Nent = 24 Chi2 / ndf = 1.799 / 7 0.8134 ± Constant = 2.214 4.223 ± Mean = 23.3 6.287 ± Sigma = 12.25

White Paper

± ± ±

% ADC Change

0 5 10 15 20 25 30 35 40 45 0 1 2 3 4 5 6 7 12m Green Fibre Nent = 24 Chi2 / ndf = 0.0843 / 2 2.035 ± Constant = 7.203 2.264 ± Mean = 17.12 2.592 ± Sigma = 8.26

White Paper

± ± ±

% ADC Change

0 5 10 15 20 25 30 35 40 45 0

1

2

3

4

5 10m Green Fibre Nent = 24 Chi2 / ndf = 0.8576 / 4 1.651 ± Constant = 4.472 1.823 ± Mean = 22 2.076 ± Sigma = 6.649

Aluminium Foil

± ± ±

% ADC Change

0 5 10 15 20 25 30 35 40 45 0

1

2

3

4

5

6 12m Green Fibre Nent = 24 Chi2 / ndf = 1.162 / 2 1.851 ± Constant = 5.045 3.746 ± Mean = 24.88 3.732 ± Sigma = 9.95

Aluminium Foil

± ± ±