ORDERING LIST for: PC3162M OM Job No:

August 7, 2001 Page 1 of 4

Engineer Designer PC Issue Circuit Issue Qty Cost Centre

Checked & Approved (Signed & dated)

M.POSTRANECKY D.J.BECKETT 2 B

Comp Ref Manufacturer & Part No or Supplier's Name & Part No

Part Description

Board Qty Total Qty Qty Ordered

Purchase Order No

Order Date

Supplier

Goods In Comments

- PC3162M/2 PC BOARD 1 -

- VERO 953-236023K KM6-II FRONT PANEL 9Ux4HP (VERSION 2) 1 FOR HOLE DETAILS SEE DRAWING A2-TE-0102-026-01-*

- VERO 173-44797C FIXING BLOCK 2 -

C1-8 C11 C16 C23
C26 C34 C53-57 C59
C66 C67 C71 C72
C75-104 C107-110
C112-158 C160-165
C167-175 C177-183
C185 C187 C188 C191
C193 C195-201 C203
C205 C207 C209-215
C217-221 C223
C225-241 C243
C245-260 C262-277
C279-310

                     AVX-KYOCERA
                     CM21X7R104K25VAT

                                                   100nF SMD Capacitor, 0805 236 Available from FARNELL 499-687

C9 C13-15 C17-21
C24 C27-33 C35-49
C52 C60 C61 C63 C64
C74

                     AVX-KYOCERA TAJB475K016R 4.7uF SMD 16V Capacitor, Case Size B 38 Available from FARNELL 498-725

C10 AVX-KYOCERA TAJD476K016R 47uF SMD 16V Capacitor, Case Size D 1 Available from FARNELL 498-762

C12 C106 C159 C184
C186 C189 C190 C192
C194 C202 C204 C206
C208 C216 C222 C224
C242 C244 C261 C278

                     AVX-KYOCERA
                     CM21X7R474K16VAT

                                                   470nF SMD Capacitor, 0805 20 Available from FARNELL 578-228

C22 C25 Siemens B37940K5470J60 47pF SMD Capacitor, 50V, 0805 2 Available from RS 211-3287

C50 C51 C105 C111 RS 298-9258 100pF SMD Capacitor, 0805, COG Dielec-
                                                   tric, 100V

                                                                                              4 -

C58 Farnell 912-967 1000uF 16V Axial Electrolytic 1 -

C62 C65 AVX-KYOCERA 08055C103KAT00J 10nF SMD Capacitor, 0805 2 Available from FARNELL 499-225

C68-70 C73 Farnell 920-460 470uF 16V Electrolytic 4 -

C166 Panasonic ECHU1H101GB5 100pF SMD Capacitor, 0805 1 Available from FARNELL 550-371

C176 AVX-KYOCERA
                     CM21X7R334K16VAT

                                                   330nF SMD Capacitor, 0805 1 Available from FARNELL 578-216

D1 Farnell 368-106 1N4148PS, Small Signal Diode 1 -

DS1 DS2 Schroff 69004-287 Bi-Level Low Current Green/Green 3.2mm
                                                   LED

                                                                                              2 -

DS3 Schroff 69004-127 Bi-Level Standard Red/Green 3.2mm LED 1 -

DS4 DS6 Schroff 69004-126 Bi-Level Standard Yellow/Yellow 3.2mm LED 2 -

DS5 DS7 DS11-18 Schroff 69004-124 Bi-Level Standard Red/Red 3.2mm LED 10 -

ORDERING LIST for: PC3162M OM Job No:

August 7, 2001 Page 2 of 4

DS8-10 Schroff 69004-125 Bi-Level Standard Green/Green 3.2mm LED 3 -

FS1-3 Farnell 319-326 5A Wire Ended Fuse 3 -

FS4 Farnell 752-710 15A Wire Ended Fuse 1 -

FS5 Farnell 529-308 10A Wire Ended Fuse 1 -

J1-3 Harting 02011602101 160way Rt-Ang Plug Har-Bus 64 System 3 Available from RS 235-6406

J4 3M 2510-6002UN 10way vert IDC hdr for J-TAG ISP port 1 -

JAUX Erni(Stuc3) 30-M-ABC 30way Rt-Ang PCB Plug 1 -

LK1 LK3-7 PL20
PL172

                     Harwin M20-999 03 05 Harwin Straight 3 pin Header 8 Can be cut from M20-999 36 05

LK2 Harwin M20-999 04 05 Harwin Straight 4 pin Header 1 Can be cut from M20-999 36 05

LK8 LK11 LK13 LK14 Comatel 3000500 2 pin 0.6 inch pitch Jumper 4 -

PL1 3M 3408-D303 32-Pin Condo double-header, PCB RT-ANG 1 -

PL2-5 PL71 PL122-
140 PL171 PL176-
179 PL184-187
PL198

                     Harwin M20-999 20 05 Harwin Straight 1 pin Header 34 Can be cut from M20-999 20 05

PL10-15 PL37 PL42
PL47-50 PL84 PL121
PL141-170 PL173-
175 PL180-183
PL188-197

                     Harwin M20-999 02 05 Harwin Straight 2 pin Header 61 Can be cut from M20-999 36 05

R1 R2 R6-37 R49 R50
R54-57 R117-120

                     Farnell 613-058 470R SMD Resistor, 0.1W, 0805 44 -

R3 Farnell 613-034 330R SMD Resistor, 0.1W, 0805 1 -

R4 R48 R51-53 R63-
69 R105-107

                     Farnell 613-095 1K0 SMD Resistor, 0.1W, 0805 15 -

R5 Farnell 613-071 680R SMD Resistor, 0.1W, 0805 1 -

R38-45 Farnell 612-947 56R SMD Resistor, 0.1W, 0805 8 -

R46 R47 R113 R114 Farnell 612-972 100R SMD Resistor, 0.1W, 0805 4 -

R58-60 R70-72 R74
R75 R77 R78 R80-89
R91 R93-96 R98-100
R108

                     Farnell 613-290 47K SMD Resistor, 0.1W, 0805 29 -

R61 Farnell 612-996 150R SMD Resistor, 0.1W, 0805 1 -

R62 Farnell 613-010 220R SMD Resistor, 0.1W, 0805 1 -

R73 R76 R79 R90 R92
R97 R111 R112

                     Farnell 613-174 4.7K SMD Resistor, 0.1W, 0805 8 -

R101 R102 Farnell 613-253 22K SMD Resistor, 0.1W, 0805 2 -

R103 R104 R109 Farnell 613-022 270R SMD Resistor, 0.1W, 0805 3 -

R110 Farnell 347-681 100K, 3266W Variable Resistor, 0.25W 1 -

R115 R116 R121-125 Farnell 613-216 10K SMD Resistor, 0.1W, 0805 7 -

RN1-4 RN6 RN9 RN31-
36 RN41-44

                     Farnell 776-749 4K7, ARC241, 4-isolated Resistors, 0.062W 16 -

RN5 Farnell 149-011 100R, 8-isolated Resistors, 2.25W 1 -

Comp Ref Manufacturer & Part No or Supplier's Name & Part No

Part Description

Board Qty Total Qty Qty Ordered

Purchase Order No

Order Date

Supplier

Goods In Comments

ORDERING LIST for: PC3162M OM Job No:

August 7, 2001 Page 3 of 4

RN7 RN8 RN28 RN29 Farnell 776-683 470R, ARC241, 4-isolated Resistors,
                                                   0.062W

                                                                                              4 -

RN10 RN27 RN30 Farnell 307-0165 390R, ARC241, 4-isolated Resistors,
                                                   0.062W

                                                                                              3 -

RN11-22 Farnell 307-0153 270R, ARC241, 4-isolated Resistors,
                                                   0.062W

                                                                                              12 -

RN23-26 Farnell 776-762 10K, ARC241, 4-isolated Resistors, 0.062W 4 -
RN37-40 Farnell 776-701 1K, ARC241, 4-isolated Resistors, 0.062W 4 -
SK1 SK10 Lemo EPG.302.HLN Lemo Socket, 2 Female PCB Mount 2 -
SK2-9 SK11-15 Lemo EPL.00.250.DTN Lemo Rt-Angle Socket Size 00, PCB Mount 13 -
SW1 SW2 RS 664-389 SPST Right-Angle Momentary Switch 2 -
SW3-6 Farnell 146-199 Sealed PCB Mount Vert Rotary Hex Switch 4 Available from Farnell 146-199
SW7-11 Thomas & Betts GDH06S 6way SMD Half Pitch Switch 5 Available from Farnell 312-691
TR1-8 Farnell 358-010 General Purpose Switching NPN Transistor 8 -
U1 NSC 74F14PC Hex Schmitt-Trigger Inverters 1 -
U2 U3 Motorola MC10H125P Quad ECL to TTL Translator 2 -
U4 U19 U20 Motorola MC10H124P Quad TTL to ECL Translator 3 -
U5 U17 U18 Motorola MC10192P Quad Bus Driver 3 -
U6 U7 U15 Motorola MC10125P Quad ECL to TTL Translator 3 -
U8-10 U21-23 U27-
31 U33-37

                     TI SN74LS123D SMD Dual Monostable 16 -

U11 U81 TI SN74LS541N Octal Buffers with 3 State Outputs 2 -
U12 Newport 50A10500 Active Buffered 10-Tap, 5ns Step Delay
                                                   Line

                                                                                              1 Available for Farnell 175-218

U13 TI SN74123N Dual Monostable 1 -
U14 U41 NSC 74F74SC SMD Dual D-Type Positive-Edge Trigger
                                                   Flip-Flops

                                                                                              2 -

U16 U24 Motorola MC10124P Quad TTL to ECL Translator 2 -
U25 U26 Euroquartz SPG8640AN Programmable Crystal Oscillator 2 -
U32 U38 U43 U54 U59
U71 U72 U76

                     VANTIS M5-384/184-7HC High Density PLD 8 -

U39 VANTIS M5-512/256-7AC High Density PLD 1 -
U40 ECM GBS-204-80.16-C 80.16MHz Crystal Clock Oscillator 1 -
U42 U87 U90-92 U96
U97

                     NSC 74F541PC Octal Buffers, 3-state outputs 7 -

U44 U79 Philips N74F541N Octal Buffers, 3-state outputs 2 -
U45 Philips 74ABT04N Hex Invertors 1 -
U46 U68 Philips N74ABT74N Dual D-Type Flip-Flop 2 -
U47 U48 IDT IDT71256SA12Y 256k CMOS SRAM (32k x 8bit) 2 -
U49-53 U60 U62 U63 Philips 74ABT541N Octal Buffer, 3-state 8 -

Comp Ref Manufacturer & Part No or Supplier's Name & Part No

Part Description

Board Qty Total Qty Qty Ordered

Purchase Order No

Order Date

Supplier

Goods In Comments

ORDERING LIST for: PC3162M OM Job No:

August 7, 2001 Page 4 of 4

U55-58 U66 U67 U69
U73

                     Data Delay Devices PDU-16F-
                     .5A4

                                                   6 Bit Programmable Delay Unit, TTL 0.5nS
                                                   Steps, Gull-Wing

                                                                                              8 -

U61 U83 Motorola MC100ELT20D TTL to Differential PECL Translator 2 -
U64 U65 IDT IDT723611L15PF CMOS 64 x 36 Synchronous FIFO 2 -
U70 NSC 74F11PC Triple 3-Input AND Gate 1 -
U74 Philips 74ABT08N Quad 2-input AND Gate 1 -
U75 Philips 74ABT125D 3-State Quad Buffer 1 -
U77 VANTIS M4-256-128-7YC High Density PLD 1 -
U78 TRACO TAM 25-2411 25W Single 5V Output DC/DC Converter 1 -
U80 Philips N74F760N Octal Buffer (Open-Collector) 1 -
U82 Philips N74LS541N Octal Buffers with 3 State Outputs 1 -
U84 U85 NSC 74F543PC Octal Registered Transceiver 2 -
U86 TI SN74F38N Quad 2 Input NAND Buffer 1 -
U88 U89 Synergy SY100E111JC 1:9 Differential Clock Driver With Enable 2 Unsocketed Device
U93 Philips 74LVT16244BDL 3.3V 16-bit Buffer/Line Driver 1 -
U94 U95 Philips 74ABT574D SMD Octal Edge Triggered D-Type Latches 2 -
U98 Motorola MC100ELT21D Differential PECL to TTL Translator 1 -
- PRECI-DIP 714-91-125-41-014 PCB CONNECTOR SOCKET 4 4 ROWS OF 25 REQUIRED FOR DAUGHTER CARD
- HARWIN D01-99-03-314 HARWIN ULTRA LOW-PROFILE SOCKETS 8 REQUIRED FOR 8 14-PIN DIPS
- HARWIN D01-99-03-316 HARWIN ULTRA LOW-PROFILE SOCKETS 17 REQUIRED FOR 17 16-PIN DIPS

- HARWIN D01-99-03-320 HARWIN ULTRA LOW-PROFILE SOCKETS 20 REQUIRED FOR 20 20-PIN DIPS

- HARWIN D01-99-03-324 HARWIN ULTRA LOW-PROFILE SOCKETS 8 REQUIRED FOR 8 24-PIN DIPS

Comp Ref Manufacturer & Part No or Supplier's Name & Part No

Part Description

Board Qty Total Qty Qty Ordered

Purchase Order No

Order Date

Supplier

Goods In Comments