x 5−10^{4−}10^{3−}10^{2−}10^{1−}10 1

Ratio

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 xg(x,Q), comparison

MC900_nnlo MCH_nnlo_30 MCH_nnlo_50 MCH_nnlo_100 Q = 1.00e+02 GeV

Generated with APFEL 2.4.0 Web