0

1

2

3

4

5

1 10 10^2 10^3 10^4 10^5

F_2 ^{em}-log_{10}(x)

Q^2(GeV^2)

ZEUS NLO-QCD Fit (Prel.) 2001 tot. error

ZEUS 96/7 BCDMS E665 NMC

x=6.32E-5 x=0.000102 x=0.000161 x=0.000253 x=0.0004 x=0.0005 x=0.000632 x=0.0008 x=0.0013

x=0.0021

x=0.0032

x=0.005

x=0.008

x=0.013 x=0.021

x=0.032 x=0.05 x=0.08 x=0.13 x=0.18 x=0.25

x=0.4 x=0.65