ZEUS

0 1 2 3 4 5 6 7 8

60 70 80 90 100 110 120 130 140 150

excluded at 95Ψ C.L.

ZEUS 95-97 (42.7 pb^{-1}) Θ^2 ≤ Θ^2 Q^2 1 GeV^2 134 Λ W Λ 277 GeV E_T^{jet} Γ 14 GeV -1 Λ η^{jet} Λ 2.5 Βcos θ^*Β Λ 0.6