ZEUS

0.5

1

1.5

2

0 2 4 6 8 10

p_T^{min} (GeV) σ_b (p_T Γ p_T^{min} ) (nb)

ZEUS 96-97

Q^2 Λ 1 GeV^2, 0.2 Λ y Λ 0.8

|η^b| Λ 2

NLO QCD m_b = 4.50 GeV, μ = m_T/2 m_b = 4.75 GeV, μ = m_T m_b = 5.00 GeV, μ = 2m_T