0

5

10

15

20

25

30

10^{-4} 10^{-3} 10^{-2} 10^{-1} 1 0

5 α_s(M_z^2) H1 1995+96

(preliminary) m_c=1.3 - 1.8 GeV

(0.118Α0.005) ZEUS 1994

(preliminary) m_c=1.3 - 1.5 GeV

(0.113Α0.005) NMC (0.113) MRSR1 (0.113) CTEQ4M (0.116) GRV94-HO (0.110)

NLO QCD fit Q^2 = 20 GeV^2

x x g(x)