8

g

01020304050607080901000123456789199519961997Month of RunningEfficiency (%)

Evtake Luminosity 1993-9751015202530354045502004006008005101520253035404550Days of runningIntegrated Luminosity (pb-1)19931994199519961997Evtake Luminosity 1993-97Days of runningIntegrated Luminosity (pb-1)1993199419951996199751015202530354045502004006008005101520253035404550 t

s

(a)Scattered positronx

11

)

3

7

e s7ei1111

eA pV eV nxm ym nxm

FCALenergyspectrumNCDISQ2G1000GeV-21/Ndn/dE(GeV-1 m e[2*2s[1*3s[2*3s[2*2s[1*3s[2*3sD*5KEBP,f(a y

s r-fresolution(u m

225mkk476A473A285A93AF KaonsElectronsProtons51 s

e 110234CTD-SLTłatencyMms35000CTD-SLTłatencyMms

n (=2kPq�gP

s 8036.09/47111.80.405449.730.8515E-03D120xOBSds/dxgZEUS96:KTalgorithm7 y

110234300

e)[]dpa140180 y

0.2-4-3-20.4-4-3-20.4-4-3-20.6-4-3-20.6-4-3-20.4-4-3-2 y 0.5-4-20.5-4-20.5-4-20.7-4-20.7-4-20.7-4-2

proton

s .