0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Channel

0 100 200 300 400 500 600 700

ST_STROBE_DELAY

0

10

20

30

40

50

60 2028.8.20220130000378_link0

0

0.2

0.4

0.6

0.8

1

1.2

Channel

0 100 200 300 400 500 600 700

ST_STROBE_DELAY

0

10

20

30

40

50

60 2028.8.20220130000378_link1

ST_STROBE_DELAY

0 10 20 30 40 50 60

1

10

210

Triggers