h_scan_evcnt Entries 9 Mean 1 RMS 0.06454

0.9 0.92 0.94 0.96 0.98 1 1.02 1.04 1.06 1.08 1.1 1.12 0 1000

2000

3000

4000

5000

6000

7000

8000

ROD Events Requested