Channel Number

100 200 300 400 500 600 700

THRESHOLD (mV)

0.9 0.92

0.94

0.96

0.98 1 1.02

1.04

1.06

1.08 1.1 1.12 h_scan0_0 Entries 6903 Mean x 411 Mean y 0.9836 RMS x 223.8 RMS y 0.06308

0 100 200 300 400 500 600 700 800 900 20220130000005 Stream 0 THRESHOLD Scan