Event Length (planes)

0 50 100 150 200 250

Number of Events

20 40 60 80

Fraction of Event PH in Track

0.0 0.2 0.4 0.6 0.8

Number of Events

20 40 60 80

Track PH Per Plane (ADC Counts)

0 500 1000 1500 2000 2500

Number of Events

0 50 100 150

PID Parameter

-1.0 -0.5 0.0 0.5 1.0

Number of Events

0 10 20 30 40^{MINOS FD}

Data Tuned MC CC MC μν+_μν NC MC