0 100 200 300 400 500 600

dxdz (degrees)

-80 -60 -40 -20 0 20 40 60 80 dydz (degrees)

-80 -60 -40 -20 0 20 40 60 80 CosmicAngles Entries 517270 Mean x 0.0388 Mean y 0.05782 RMS x 30.07 RMS y 47.95 0 0 0 0 517270 0 0 0 0 Integral 5.173e+05

Vertical vs Horizontal Angle (wrt beamline) for Cosmic Muons