green0_adc_pfx Entries 4087004 Mean 1.624 RMS 0.3977 Underflow 0 Overflow 0.05 Integral 484.5

1 1.5 2 2.5 3 3.5 4 4.5 5 3 3.5 4 4.5 5 5.5 6 green0_adc green1_adc_pfx

Entries 3841653 Mean 1.609 RMS 0.3952 Underflow 0 Overflow 0.05 Integral 515.2

1 1.5 2 2.5 3 3.5 4 4.5 5 3 3.5 4 4.5 5 5.5 6 green1_adc_pfx

green1_adc

clear0_adc_pfx

Entries 4087004 Mean 1.62 RMS 0.3975 Underflow 0 Overflow 0.05 Integral 604.5

1 1.5 2 2.5 3 3.5 4 4.5 5 3 3.5 4 4.5 5 5.5 6 clear0_adc clear1_adc_pfx

Entries 3841653 Mean 1.612 RMS 0.3957 Underflow 0 Overflow 0.05 Integral 619.1

1 1.5 2 2.5 3 3.5 4 4.5 5 3 3.5 4 4.5 5 5.5 6 clear1_adc_pfx clear1_adc