0 200 400 600 800 1000 0

0.5

1

1.5

2

2.5

3 fitmeanc Nent = 47 Mean = 231.5 RMS = 47.75

Clear Fit Mean

0 200 400 600 800 1000 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 meanc Nent = 47 Mean = 335.3 RMS = 66.4

Clear Mean

0 1 2 3 4 5 6 7 8 9 10 0

2

4

6

8

10 chi2c Nent = 52 Mean = 1.29 RMS = 0.7141

Clear Chi/NDF

0 20 40 60 80 100 0

0.5

1

1.5

2

2.5

3 scalec Nent = 47 Mean = 49.18 RMS = 9.466

Clear NPE Scale