0 200 400 600 800 1000 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 meanc Nent = 47 Mean = 335.3 RMS = 66.4

Clear Mean

0 200 400 600 800 1000 0

0.5

1

1.5

2

2.5

3 fitmeanc Nent = 47 Mean = 231.5 RMS = 47.75

Clear Fit Mean

0 100 200 300 400 500 600 0

100

200

300

400

500

600 meancompc Nent = 47 Mean x = 335.3 Mean y = 231.4 RMS x = 66.42 RMS y = 47.83

Clear Scatter Plot of Mean vs Fit Mean

0 100 200 300 400 500 600 700 0

200

400

600

800

1000

meanvnumentc Nent = 47 Mean x = 335.3 Mean y = 535.6 RMS x = 66.42 RMS y = 185.9

Clear Scatter Plot of Mean vs Nument Mean