0 500 1000 1500 2000 2500 0 5 10 15 20 25 30 35

22_20 Nent = 371 Mean = 254.5 RMS = 164.8 Chi2 / ndf = 28.6 / 24 9.388 ± mean = 184.6 5.936 ± width = 19.97 188.5 ± norm_const = 583.7 0 ± spec_range = 857 0 ± scale = 46.61

22_20 22_20

± ± ± 0 ± 0 ±