0 200 400 600 800 1000 1200 1400 1600 1800 0 5 10 15 20 25 30 35

24_8 Nent = 387 Mean = 165.9 RMS = 112.5 Chi2 / ndf = 19.65 / 24 4.707 ± mean = 107.8 2.987 ± width = 20.31 77.93 ± norm_const = 504.5 0 ± spec_range = 603 0 ± scale = 29.53

24_8 24_8

± ± ± 0 ± 0 ±