0 500 1000 1500 2000 2500 0

5

10

15

20

25

30

26_21 Nent = 299 Mean = 249 RMS = 168.1 Chi2 / ndf = 22.74 / 24 10.34 ± mean = 157.7 6.32 ± width = 34.2 46.87 ± norm_const = 262.8 0 ± spec_range = 831 0 ± scale = 49.1

26_21 26_21

± ± ± 0 ± 0 ±