0 500 1000 1500 2000 2500 3000 0 10 20 30 40 50 60 70 3_15 Nent = 679 Mean = 287.9 RMS = 186.6 Chi2 / ndf = 26.9 / 26 5.432 ± mean = 196.7 3.508 ± width = 38.34 88.88 ± norm_const = 913.8 0 ± spec_range = 985 0 ± scale = 40.67

3_15 3_15

± ± ± 0 ± 0 ±