0 500 1000 1500 2000 2500 0

10

20

30

40

50 5_22 Nent = 537 Mean = 233 RMS = 148.4 Chi2 / ndf = 20 / 26 5.971 ± mean = 170.2 4.041 ± width = 19.62 146.6 ± norm_const = 637.9 0 ± spec_range = 766 0 ± scale = 53.57

5_22 5_22

± ± ± 0 ± 0 ±