0 200 400 600 800 1000 0 2 4 6 8 10 12 14 16 18 20 22 peakg Nent = 906 Mean = 157.9 RMS = 45.76

Green Peak

peakg

0 200 400 600 800 1000 0 2 4 6 8 10 12 14 16 meang Nent = 906 Mean = 233.3 RMS = 62.26

Green Mean

0 200 400 600 800 1000 0

5

10

15

20

25

30 peakc Nent = 1030 Mean = 196.5 RMS = 45.04

Clear Peak

0 200 400 600 800 1000 0 2 4 6 8 10 12 14 16 18 meanc Nent = 1030 Mean = 288.7 RMS = 67.57

Clear Mean