0 100 200 300 400 500 0

0.5

1

1.5

2

2.5

3 fitmeang Nent = 37 Mean = 152.1 RMS = 34.56

Green Fit Mean

0 100 200 300 400 500 0

0.5

1

1.5

2

2.5

3 meang Nent = 37 Mean = 242 RMS = 33.81

Green Mean

0 1 2 3 4 5 6 7 8 9 10 0 1 2 3 4 5 6 7 chi2g Nent = 43 Mean = 1.282 RMS = 0.6736

Green Chi2/NDF

0 20 40 60 80 100 0

0.5

1

1.5

2

2.5

3 scaleg Nent = 37 Mean = 50.66 RMS = 14.58

Green NPE Scale