0 100 200 300 400 500 600 0

0.5

1

1.5

2

2.5

3 meang Nent = 37 Mean = 242 RMS = 33.81

Green Mean

0 100 200 300 400 500 600 0

0.5

1

1.5

2

2.5

3 fitmeang Nent = 37 Mean = 152.1 RMS = 34.56

Green Fit Mean

0 50 100 150 200 250 300 350 400 0 50 100 150 200 250 300 350 400 450 meancompg Nent = 37 Mean x = 242 Mean y = 152.1 RMS x = 33.81 RMS y = 34.56

Green Scatter Plot of Mean vs Fit Mean

0 50 100 150 200 250 300 350 400 450 0

100

200

300

400

500

600 meanvnumentg Nent = 37 Mean x = 242 Mean y = 328.5 RMS x = 33.81 RMS y = 59.12

Green Scatter Plot of Mean vs Nument Mean meanvnumentg