0 200 400 600 800 0 1 2 3 4 5 6 7 histoclear Nent = 488 Mean = 243.4 RMS = 49.52 Chi2 / ndf = 113.4 / 181 0.2285 ± Constant = 2.987 4.286 ± Mean = 242.3 6.099 ± Sigma = 63.17

histoclear

± ± ±

0 200 400 600 800 0 1 2 3 4 5 6 7 8 9 histogreen Nent = 488 Mean = 197.6 RMS = 41.81 Chi2 / ndf = 133.7 / 161 0.251 ± Constant = 3.214 3.804 ± Mean = 196 5.399 ± Sigma = 54.24

histogreen

± ± ±