Frac Diff in ADCs

-1 -0.5 0 0.5 1 0 20 40 60 80 100 Entries 908 Mean 0.1313 RMS 0.09317 / ndf

2χ 43.82 / 36 Prob 0.1737 Constant 4.079± 88.35 Mean 0.002673± 0.1331 Sigma 0.002448±

0.07808

Frac Diff in Truncated Means - (after-before)/before^{Entries 908}

Frac Diff in NPEs

-1 -0.5 0 0.5 1 0 5 10 15 20 25 30 35 40 45 Entries 908 Mean -0.04746 RMS 0.2076 / ndf

2χ 75.35 / 68 Prob 0.2529 Constant 1.776± 39.12 Mean 0.005883±

-0.0595 Sigma 0.004894± 0.1673

Frac Diff in NPEs (from Truncated Means) - (after-before)/before Entries 908

-0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

(Crate*60) + Plane

0 20 40 60 80 100

Strip

0 5 10 15 20

correlation Entries 2880 Mean x 66.78 Mean y 12.61 RMS x 34.85 RMS y 7.076 0 0 0 0 -191368 0 0 0 0 Integral -1.914e+05

Strip vs Plane weighted by Frac Diff in NPEs^{correlationEntries 2880Mean x 66.78Mean y 12.61RMS x 34.85RMS y 7.076 0 0 0} 0 -191368 0 0 0 0 _{Integral -1.914e+05}