Beam Energy (GeV)

1 1.2 1.4 1.6 1.8 2

Average MIP Value (NPE)

2.9 3 3.1 3.2 3.3 3.4 3.5 3.6 3.7

Average Muon Energy Loss as a function of Beam Energy (Green Fibre Readout)