0.8 1 1.2 1.4 1.6 1.8 2 20 25 30 35 40 45 50 55

Graph

Beam Energy

Stopping Plane

55 Chi2 / ndf = 1 / 3 0.9355 ± p0 = -1.416 0.6563 ± p1 = 28.33 ± ± ± ± ± ± ± ± ± ± ± ± ± ± ± ± ± ± ± ± Chi2 / ndf = 1 / 3 ± ±