0 2000 4000 6000 8000 10000120001400016000 0

1

2

3

4

5

6 adc_spread Nent = 290 Mean = 8970 RMS = 3264

adc_spread adc_spread

0 2000 4000 6000 8000 10000120001400016000 0 1 2 3 4 5 6 7 8 9 adc_spread Nent = 290 Mean = 7239 RMS = 3021

adc_spread adc_spread

Led 1 without fibre correction with fibre correction