0 100 200 300 400 500 600 0

5

10

15

20

25

norm Nent = 303 Mean = 147.8 RMS = 93.5

norm led_1_{norm}

0 100 200 300 400 500 600 0 2 4 6 8 10 12 14 16 18 20 22 corrected Nent = 303 Mean = 194.1 RMS = 106

corrected led_6_{corrected}