0 2000 4000 6000 8000 10000120001400016000 0

2

4

6

8

10 adc_spread Nent = 323 Mean = 4654 RMS = 1808 adc_spread adc_spread

0 2000 4000 6000 8000 10000120001400016000 0

2

4

6

8

10 adc_spread Nent = 323 Mean = 6314 RMS = 2585 adc_spread adc_spread

Led 2 without fibre correction with fibre correction