0 100 200 300 400 500 600 0

5

10

15

20

25

30

35 norm Nent = 324 Mean = 111.3 RMS = 54.51 norm led_2 norm

0 100 200 300 400 500 600 0

10

20

30

40

50 corrected Nent = 324 Mean = 85.61 RMS = 50.2 corrected led_5