0 100 200 300 400 500 600 0

10

20

30

40

50

norm Nent = 443 Mean = 117.1 RMS = 73.99

norm led_4_{norm}

0 100 200 300 400 500 600 0

10

20

30

40

50

60

corrected Nent = 443 Mean = 116.7 RMS = 68.55

corrected led_3_{corrected}