Led 4 without cable correction with cable correction

0 2000 4000 6000 8000 10000 12000 14000 16000 0 1 2 3 4 5 6 7 8 adc_spread Nent = 246 Mean = 6412 RMS = 2945

adc_spread_{adc_spread}

0 2000 4000 6000 8000 10000 12000 14000 16000 0 1 2 3 4 5 6 7 adc_spread Nent = 246 Mean = 6676 RMS = 2688

adc_spread_{adc_spread}