0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 1 2 3 4 5 6 7 led 0 Nent = 50 Mean = 1.043 RMS = 0.2122

led 0_{led 0}

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 1 2 3 4 5 6 7 led 1 Nent = 50 Mean = 1.037 RMS = 0.2126

led 1_{led 1}

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

1

2

3

4

5 led 2 Nent = 50 Mean = 1.051 RMS = 0.2027

led 2_{led 2}

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

1

2

3

4

5 led 3 Nent = 50 Mean = 1.037 RMS = 0.2268

led 3_{led 3}

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

1

2

3

4

5

6 led 4 Nent = 50 Mean = 1.069 RMS = 0.2027

led 4_{led 4}

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

1

2

3

4

5

6 led 5 Nent = 50 Mean = 1.036 RMS = 0.2819

led 5_{led 5}