-0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2 0

20

40

60

80

100 npe Nent = 1502 Mean = -0.01135 RMS = 0.02723 Chi2 / ndf = 72.34 / 51 3.419 ± Constant = 98.69 0.0006326 ± Mean = -0.01245 0.0005214 ± Sigma = 0.02313

Frac Diff in NPEs - (after-before)/before

± ± ±

-0.2 -0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2 0

20

40

60

80

100

120 npemean Nent = 1502 Mean = -0.01135 RMS = 0.02495 Chi2 / ndf = 73.04 / 45 3.726 ± Constant = 102.6 0.0005924 ± Mean = -0.01166 0.0005537 ± Sigma = 0.02223

Frac Diff in NPEs (from means) - (after-before)/before

± ± ±