Time

16 18 20 22 00 02 04 06 08

NPEs

4.5 4.55 4.6 4.65 4.7 4.75 4.8 Green Readout, MIP values (from Means) vs Time

Time

16 18 20 22 00 02 04 06 08

NPEs

5.4

5.45

5.5

5.55

5.6

5.65

Clear Readout, MIP values (from Means) vs Time

Time

16 18 20 22 00 02 04 06 08

NPEs

3.04

3.06

3.08 3.1 3.12

3.14

3.16

3.18 3.2 3.22

Green Readout, MIP values (from Fitted Peaks) vs Time

Time

16 18 20 22 00 02 04 06 08

NPEs

3.78 3.8 3.82

3.84

3.86

3.88 3.9 3.92

3.94

3.96

3.98

Clear Readout, MIP values (from Fitted Peaks) vs Time