htemp

Entries 12711 Mean 16.31 RMS 10.32 Underflow 0 Overflow 0 Integral 1.271e+04

0 10 20 30 40 50 60 0 100 200 300 400 500 600 700 800 900

fvertex2[0] {fvertex1[0]==0&&(fvertex2[1]==10||fvertex2[1]==11||fvertex2[1]==12||fvertex2[1]==13)}