0 500 1000 1500 2000 2500 0 20 40 60 80 100 120 140 3_15 Nent = 1031 Mean = 480.8 RMS = 230.3 Chi2 / ndf = 45.19 / 26 14.01 ± mean = 386.4 6.164 ± width = 31.84 414.4 ± norm_const = 3536 109.8 ± spec_range = 1126 5.462 ± scale = 32.59

3_15

± ± ± ± ±