0 500 1000 1500 2000 2500 3000 3500 0 20 40 60 80 100 120 140 160 all_mu Nent = 1270 Mean = 482.5 RMS = 284.5 Chi2 / ndf = 77.58 / 32 5.746 ± mean = 376.7 3.081 ± width = 24.72 169.1 ± norm_const = 1363 0 ± spec_range = 1589 0 ± scale = 62

all_mu

± ± ± 0 ± 0 ±