ADC 0 1000 2000 3000 4000 5000 6000 7000 8000 9000

1

10

Va_0_Ch_14_pulse Nent = 7174 Mean = 4742 RMS = 729.7

Va_0_Ch_14_pulse_{Va_0_Ch_14_pulse}