ADC 100 150 200 250 300 350 400 450 500

1

10

10^2

Va_0_Ch_11_pulse Nent = 2179 Mean = 132.2 RMS = 52.06

Va_0_Ch_11_pulse_{Va_0_Ch_11_pulse}