100 150 200 250 300

1

10

10^2

Chi2 / ndf = 165.8 / 166 0 ± pedpos = 100 0.01673 ± meanpe = 0.4076 1.847 ± spepos = 72.92 0.03619 ± spewidth = 0.4129 0.01736 ± dynodefrac = 0.04078 0 ± pedsigma = 3.237 0.7788 ± dynscale = 4.802 0 ± numentries = 2199

Chan_0_9 Chi2 / ndf = 165.8 / 166 0 ± ± ± ± ± 0 ± ± 0 ±