theHist Entries 179136 Mean 29.5 RMS 17.3 Underflow 0 Overflow 0 Integral 157.8 / ndf

2χ 133 / 51 Prob 1.967e-10 p0 0.009271 ± 2.679 p1 0.0002789 ± -0.002327

0 10 20 30 40 50 0 0.5 1 1.5 2 2.5 3

± ±

mip_planeC

res Entries 53

Mean 32.08

RMS 14.17

Underflow 0

Overflow 0

Integral 0.178

0 10 20 30 40 50

-0.05 0 0.05 0.1 0.15

Residuals. resh Entries 53 Mean 0.003358 RMS 0.02554 Underflow 0 Overflow 0 Integral 53 / ndf

2χ 6.392 / 9 Prob 0.7002 Constant 1.828±

9.034 Mean 0.002623 ± 0.00234 Sigma 0.002515 ± 0.01667

-0.2 -0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2 0 1 2 3 4 5 6 7 8 9 resh

± ±

Residuals.