sumHistE Entries 660 Mean 2.427 RMS 0.1161 Underflow 0 Overflow 0 Integral 660 / ndf

2χ 46.18 / 33 Prob 0.06356 Constant 3.988± 76.79 Mean 0.002578 ± 2.423 Sigma 0.002087 ± 0.06378

0 0.5 1 1.5 2 2.5 3 3.5 4 0 10 20 30 40 50 60 70 80

± ±

sumHistE

sumHistO Entries 686 Mean 2.444 RMS 0.1204 Underflow 0 Overflow 0 Integral 686 / ndf

2χ 38.09 / 38 Prob 0.4653 Constant 4.301± 85.73 Mean 0.00238 ± 2.439 Sigma 0.001888 ± 0.06032

0 0.5 1 1.5 2 2.5 3 3.5 4 0 20 40 60 80 100

± ±

sumHistO