0 1000 2000 3000 4000 -1 10 1 10 210 ’NEW’ (UK) ’NEW’ (Oslo) ’TYPE2’ (UK) ’TYPE2’ (OSLO)

TOP

-1 events / bin / 100 pb

1

0 1000 2000 3000 4000 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

ratio

(GeV) effm 0

1

2