-3 -2 -1 0 1 2 3 0 200 400 600 800 1000

1200

1400

1600

Jet Phi Distance JetDeltaPhi

Entries 11383 Mean -0.008477 RMS 2.781 Underflow 0 Overflow 0

Jet Phi Distance