-3 -2 -1 0 1 2 3 40 42 44 46 48 50 52 54 Jet Et vs phi AveJetEtvsPhi

Entries 81407 Mean -0.007483 Mean y 47.23 RMS 1.812 RMS y 73.97 Underflow 0 Overflow 0

Jet Et vs phi