-3 -2 -1 0 1 2 3 190 200 210 220 230 240 250

Jet E vs phi AveJetEvsPhi

Entries 84822 Mean -0.01103 Mean y 218.5 RMS 1.812 RMS y 330.4 Underflow 0 Overflow 0

Jet E vs phi